Rijksmuseum – Cruz & Ortiz + Jean-Michel Wilmotte (The Netherlands)

The Netherlands > Images of the situation previous to Amsterdam Rijksmuseum‘s official opening, on April 13, 2013, after restoration by Antonio Ortiz e Antonio Cruz + Jean-Michel Wilmotte [facebook/Cruz y Ortiz arquitectos].