Rijksmuseum restored by Cruz & Ortiz + Jean-Michel Wilmotte (The Netherlands)

The Netherlands > Amsterdam Rijksmuseum will open its doors on April 13, 2013, after a 10- year long restoration work under the direction of Antonio Ortiz & Antonio Cruz + Jean-Michel Wilmotte [Architectura Record].